130˚W

130˚W

120˚W

120˚W

110˚W

110˚W

100˚W

100˚W

90˚W

90˚W

80˚W

80˚W

70˚W

70˚W

20˚N 20˚N

30˚N 30˚N

40˚N 40˚N

50˚N 50˚N

Seismicity of the United States: 1990 - 2000

-800 -500 -300 -150 -70-35 0 Depth (km)