1744 human splice acceptor binding sites

bits

5′GATC GATC GACT GATC GACT GACT GACT AGCT GACT AGCT AGCT AGCT AGCT AGCT AGC T AGC T AGC T AGCT GACT GAC T GAC T GAC T ATGC GAT C GTCATACGTCAGCGAT 3′