-160˚

-160˚ -159˚

-159˚

-158˚

-158˚ -157˚

-157˚

-156˚

-156˚ -155˚

-155˚

19˚

19˚

20˚

20˚

21˚

21˚

22˚

22˚

H

105

Supplemental contours are shown dotted. L - local low H - local high

2

4

6

6

8

10

12

14

16

18

20

25

30

40

60

80

100

no city

024681012141618202530406080100200

%g

U.S. Geological Survey National Seismic Hazard Mapping Project Based on:

1. USGS Open-File Report - in progress 2. USGS Open-File Report - in progress

Horizontal Spectral Response Acceleration (%g) for 1.0 Sec Period (5% of Critical Damping) With 10% Probability of Exceedance in 50 Years Firm Rock - 760 m/sec shear wave velocity

Scale - 1:3750000 Albers Equal-Area Conic Projection Standard Parallels 8.0^oN and 18.0^oN

0 50 100 km

0 50 100

miles

nothing