050100150200250300350400450500550600650700

HCEN. DISTANCE (KM)

050100150200250300350400450500550600650700

HCEN. DISTANCE (KM)

5.05.56.06.57.07.58.08.59.09.5

MAGNITUDE (Mw)

5.05.56.06.57.07.58.08.59.09.5

MAGNITUDE (Mw)

3691215

% Contrib. to Hazard

GMT Mar 12 08:44 NnlSeisHaz 2% PE/50 yr. Pk Gr Accel 0.234 g. Red: log(PGA) gt mu+2sigma; Orange 1 - 2; Yellow 0 - 1;

Juneau AK Seismic Hazard

Pk. Gr. Accel. 0.234 g PE = 2% in 50 years Mbar 7.19 dbar 55.4 km Mmode 8.0 dmode 34.9 km (13.4% contribution)