-121˚ -120˚

35.5˚

36˚

36.5˚

37˚

0.1

0.1

0.1

0.1

0.1

0.1

0.2

0.2

0.2

0.3

0.3

0.4

0.5

CISN 0.3 s Pseudo-Acceleration Spectra (%g) for Coalinga Earthquake

Mon May 2, 1983 04:42:00 PM PDT M 6.5 N36.23 W120.31 Depth: 10.0km ID:Coalinga

PROCESSED: Mon Jun 23, 2003 11:24:02 AM PDT, NOTE: These are automated maps based on instrumental response spectra, and may not be appropriate for comparison with design spectral values.

0 10 20 30 km